
\begin{figure}[!htb]
    \centering
    \includegraphics[width=.75\linewidth]{./results-benchmark/win_edge_simplify_stack_false.png}
    \caption{Simplify.wasm runtime analysis benchmark result of Windows device with Edge browser on dataset "Simplify.js example" without high quality mode.}
    \label{fig:win_edge_simplify_stack_false}
\end{figure}
