
\begin{figure}[!htb]
    \centering
    \includegraphics[width=.75\linewidth]{./results-benchmark/win_chro_simplify_vs_true.png}
    \caption{Simplify.wasm vs. Simplify.js benchmark result of Windows device with Chrome browser on dataset "Simplify.js example" with high Quality mode.}
    \label{fig:win_chro_simplify_vs_true}
\end{figure}
